(GeV) pK m 1.4 1.6 1.8 2

Counts

0 20 40 60 80 100 120 140 / ndf

2χ 5.027 / 46 Prob 1 p0 31.38± 24.83 p1 0.01734 ± 0.08419 p2 0.4934 ± 14.63 p3 0.03772 ± 1.516

± ± ±