(GeV) pK m 1.4 1.6 1.8 2

Counts

0 20 40 60 80 100 120 140 / ndf

2χ 127.7 / 47

Prob 1.178e-10 p0 0± 24.83 p1 0± 0.08419 p2 0± 14.63 p3 0± 1.516 p4 0.108± 0.4764 p5 0.001475 ± 1.543 p6 0.001382 ± 0.005549 ± ± 20.6 ± Signal=90.9 16.8 ± Back=280.8 Naive Sig=5.4 ln(LB)=7358.0 ln(LB+S)=7371.1 Log Sig=5.1