(GeV) pK m 1.4 1.6 1.8 2

Counts

0 20 40 60 80 100 120 140 160 180 200 / ndf

2χ 42.21 / 46 Prob 0.6319 p0 0.4165 ± 5.671 p1 0.002555 ± 0.035 p2 1.476 ± 44.02 p3 0.002026 ± 1.48

± ± ± ±