(GeV) pK m 1.4 1.6 1.8 2

Counts

0 20 40 60 80 100 120 140 / ndf

2χ 59.58 / 49 Prob 0.143 p0 0.3588 ± 5.201 p1 0.001543 ± 0.02823 p2 0.8698 ± 24.78 p3 0.001842 ± 1.48

± ± ± ±