(GeV) pK m 1.4 1.6 1.8 2

Counts

0 20 40 60 80 100 120 140 / ndf

2χ 41.38 / 46 Prob 0.6659 p0 0± 5.201 p1 0± 0.02823 p2 0.3939 ± 17.76 p3 0± 1.48 p4 0.1094 ± 0.4114 p5 0.001518 ± 1.544 p6 0.001357 ± 0.005071

±

± ± ± 20.9 ± Signal=78.5 16.3 ± Back=266.2 Naive Sig=4.8 ln(LB)=7389.3 ln(LB+S)=7402.0 Log Sig=5.0