pK m 1.4 1.6 1.8 2

events

0 20 40 60 80 100 120 140 160 180 200 220 240 / ndf

2χ 82.72 / 93 Prob 0.7686 p0 0.124± 5.629 p1 0.00157 ± 0.03443 p2 0.52± 36.25 p3 0.002± 1.469 p4 0.171± 1.167 p5 0.001± 1.541 p6 0.001021 ± 0.005075 ln(LB)=20201.6 ln(LB+S)=20235.3 Log Sig=8.2 Nevents=6000 Gen signal=172.657 Gen back=460.566 Gen S/B=0.375 Gen S/sqrt(B)=8.045

Phi_norm=1.000 Theta_norm=1.000 27.3 ± Fit Signal=185.6 21.9 ± Fit Back=479.3 Fit S/B=0.387 S/sqrt(B)=8.480

pK m 1.4 1.6 1.8 2

events

0 20 40 60 80 100 120 140 160 180 200 220 240 / ndf

2χ 136.3 / 96 Prob 0.004347 p0 0.142± 5.884 p1 0.00144 ± 0.03499 p2 0.50± 36.92 p3 0.002± 1.472