pK m 1.4 1.6 1.8 2

events

0 20 40 60 80 100 120 140 / ndf

2χ 85.66 / 93 Prob 0.6927 p0 0.195± 5.594 p1 0.00190 ± 0.03361 p2 0.44± 24.27 p3 0.002± 1.469 p4 0.2115± 0.5108 p5 0.002± 1.541 p6 0.00331 ± 0.00492 ln(LB)=11808.6 ln(LB+S)=11818.7 Log Sig=4.5 Nevents=4000 Gen signal=72.763 Gen back=310.555 Gen S/B=0.234 Gen S/sqrt(B)=4.129

Phi_norm=1.000 Theta_norm=1.000 33.6 ± Fit Signal=81.3 17.5 ± Fit Back=305.4 Fit S/B=0.266 S/sqrt(B)=4.650

pK m 1.4 1.6 1.8 2

events

0 20 40 60 80 100 120 140 / ndf

2χ 103.3 / 96 Prob 0.2862 p0 0.174± 5.785 p1 0.00173 ± 0.03425 p2 0.41± 24.58 p3 0.00± 1.47