pK m 1.4 1.6 1.8 2

events

0

50

100

150

200

250

/ ndf

2χ 82.52 / 93 Prob 0.7733 p0 0.148± 5.642 p1 0.00164 ± 0.03468 p2 0.5± 36.2 p3 0.00± 1.47 p4 0.20± 1.75 p5 0.00± 1.54 p6 0.00061 ± 0.00489 ln(LB)=20651.1 ln(LB+S)=20725.0 Log Sig=12.2 Nevents=6090 Gen signal=258.966 Gen back=460.533 Gen S/B=0.562 Gen S/sqrt(B)=12.067

Phi_norm=1.000 Theta_norm=1.500 32.0 ± Fit Signal=278.3 21.7 ± Fit Back=470.2 Fit S/B=0.592 S/sqrt(B)=12.836

pK m 1.4 1.6 1.8 2

events

0

50

100

150

200

250

/ ndf

2χ 189.4 / 96 Prob 8.362e-09 p0 0.144± 5.971 p1 0.00140 ± 0.03519 p2 0.50± 37.08 p3 0.002± 1.473