pK m 1.4 1.6 1.8 2

events

0 10 20 30 40 50 60 70 80 / ndf

2χ 111.7 / 93 Prob 0.0909 p0 0.330± 6.635 p1 0.00291 ± 0.03201 p2 0.238± 8.407 p3 0.004± 1.472 p4 0.0877± 0.4588 p5 0.00± 1.54 p6 0.000637 ± 0.004132 ln(LB)=3148.8 ln(LB+S)=3172.0 Log Sig=6.8 Nevents=1545 Gen signal=86.316 Gen back=115.125 Gen S/B=0.750 Gen S/sqrt(B)=8.045

Phi_norm=0.500 Theta_norm=1.000 14.0 ± Fit Signal=73.0 10.2 ± Fit Back=104.4 Fit S/B=0.699 S/sqrt(B)=7.143

pK m 1.4 1.6 1.8 2

events

0 10 20 30 40 50 60 70 80 / ndf

2χ 142.8 / 96 Prob 0.00139 p0 0.335± 7.043 p1 0.00255 ± 0.03342 p2 0.233± 8.642 p3 0.003± 1.476