selection cut k-t 0 0.5 1 1.5 2 2.5

cut K Integral below -t

1

10

210

310

integ1

Entries 100 Mean 1.476 RMS 0.5976 -1 Signal, b1=10.0 GeV_{-1} Background, b2=4.0 GeV Weight=Gaussian

Signal events=200 Background events=1500 selection cut k-t 0 0.5 1 1.5 2 2.5

cut K S/B below -t

-2 10

-1 10

1 sigb

Entries 92 Mean 1.248 RMS 0.6956

Signal/Background

selection cut k-t 0 0.5 1 1.5 2 2.5

cut K below -t B S/

0 1 2 3 4 5 6 7 8 9 10 sigsqrtb

Entries 92 Mean 1.412 RMS 0.6299

Signal/Sqrt(Background)