1

10

210

K-t 0 0.5 1 1.5 2 2.5

ϕ-t

0

0.5

1

1.5

2

2.5 Signal^{sig}_{Entries 100000}

Mean x 0.4823 Mean y 0.4855 RMS x 0.4552 RMS y 0.4566

Signal

1

10

210

K-t 0 0.5 1 1.5 2 2.5

ϕ-t

0

0.5

1

1.5

2

2.5 Background^{back}_{Entries 100000}

Mean x 1.248 Mean y 0.2523 RMS x 0.7215 RMS y 0.2506

Background

k-t 0 0.5 1 1.5 2 2.5

events

0 500 1000

1500

2000

2500

3000

3500

4000

4500 expon1

Entries 100000 Mean 0.4823 RMS 0.4552 / ndf

2χ 120.9 / 82 Prob 0.003377 Constant 0.011 ± 8.527 Slope 0.01±

-2.01

k-t 0 0.5 1 1.5 2 2.5

events

940 960 980 1000

1020

1040

1060

1080 expon2

Entries 100000 Mean 1.248 RMS 0.7215 / ndf

2χ 68.34 / 82 Prob 0.8599 Constant 0.009±

6.915 Slope 0.00570 ± -0.00573