1

10

210

K-t 0 0.5 1 1.5 2 2.5

ϕ-t

0

0.5

1

1.5

2

2.5 Signal^{sig}_{Entries 100000}

Mean x 0.5408 Mean y 0.45 RMS x 0.212 RMS y 0.2991

Signal

1

10

210

310

K-t 0 0.5 1 1.5 2 2.5

ϕ-t

0

0.5

1

1.5

2

2.5 Background^{back}_{Entries 100000}

Mean x 0.5166 Mean y 0.3998 RMS x 0.1826 RMS y 0.2527

Background

k-t 0 0.5 1 1.5 2 2.5

events

0 1000

2000

3000

4000

5000

6000

7000

8000 expon1

Entries 100000 Mean 0.5408 RMS 0.212 / ndf

2χ 1299 / 61 Prob 0 Constant 0.01±

10.93 Slope 0.016 ± -4.692

k-t 0 0.5 1 1.5 2 2.5

events

0 1000

2000

3000

4000

5000

6000

7000

8000

9000 expon2

Entries 100000 Mean 0.5166 RMS 0.1826 / ndf

2χ 1955 / 60 Prob 0 Constant 0.01±

11.37 Slope 0.018 ± -5.475