(degrees) ππϕ 0 50 100 150 200 250 300 350 0

50

100

150

200

250

300 < .32ππ

.28 < W < .36 ππ .32 < W < .40 ππ .36 < W

April 26, 2012 DL

svn revsion 9024

Generated values

CM frame ππ measured realtive to +x axis in ππϕ system in Lab frame

-π^+π

Azimuthal distribution of