//Default Title Font. It will used in case the OS specified font macro was not defined.
Example Title = Arial-bold-18

//Title Font for Linux GTK 
Example Title(linux_gtk) = Sans-bold-18

//Title Font for MacOS
Example Title(macosx) = Lucida Grande-bold-18

Example Text = SystemDefault-regular-10

Example LinkText = SystemDefault-italic-10

Default = Verdana-regular-10
Text = Verdana-regular-10
LinkText = Verdana-regular-10

Header 2 = Cantarell-bold-14
