\begin{thebibliography}{1}

\bibitem{Leverington2008327}
B.D. Leverington, G.J. Lolos, Z.~Papandreou, R.~Hakobyan, G.M. Huber, K.L.
  Janzen, A.~Semenov, E.B. Scott, M.R. Shepherd, D.S. Carman, D.W. Lawrence,
  E.S. Smith, S.~Taylor, E.J. Wolin, F.J. Klein, J.P. Santoro, D.I. Sober, and
  C.~Kourkoumeli.
\newblock Performance of the prototype module of the gluex electromagnetic
  barrel calorimeter.
\newblock {\em Nuclear Instruments and Methods in Physics Research Section A:
  Accelerators, Spectrometers, Detectors and Associated Equipment}, 596(3):327
  -- 337, 2008.

\bibitem{gx1801}
David Lawrence.
\newblock Bcal segmentation.
\newblock Technical Report GlueX-doc-1801, JLab, 2011.

\end{thebibliography}
