Pulse height (V)

0 0.5 1 1.5 2 5 6 7 8 9 10 11 12 13 14 15 wL Entries 1000 Mean x 0.7076 Mean y 10.05 RMS x 0.331 RMS y 0.4573 Integral 916 0 0 0 0 916 84 0 0 0 / ndf 2 χ 2.1e+04 / 485 p0 0.01816 ± 11.89 p1 0.002185 ± 0.2347

2 ± ±

t_L vs P_L

0 0.5 1 1.5 2 5 6 7 8 9 10 11 12 13 14 15 wR Entries 1000 Mean x 0.7077 Mean y 10.05 RMS x 0.3313 RMS y 0.4553 Integral 916 0 0 0 0 916 84 0 0 0 / ndf 2 χ 2.057e+04 / 494 p0 0.01739 ± 11.91 p1 0.002112 ± 0.2344

2 ± ±

t_R vs P_R

0 0.5 1 1.5 2 5 6 7 8 9 10 11 12 13 14 15 wT Entries 1000 Mean x 0.7132 Mean y 10.04 RMS x 0.3424 RMS y 0.4719 Integral 923 0 0 0 0 923 77 0 0 0 / ndf 2 χ 2.868e+04 / 490 p0 0.01747 ± 11.65 p1 0.002049 ± 0.2042

2 ± ±

t_T vs P_T

0 0.5 1 1.5 2 5 6 7 8 9 10 11 12 13 14 15 wB Entries 1000 Mean x 0.7132 Mean y 10.04 RMS x 0.3418 RMS y 0.4672 Integral 923 0 0 0 0 923 77 0 0 0 / ndf 2 χ 2.926e+04 / 501 p0 0.01683 ± 11.78 p1 0.002022 ± 0.2192

2 ± ±

t_B vs P_B