sigtraw

Entries 1000

Mean 17.48

RMS 0.5629

Underflow 0

Overflow 0

Integral 1000

10 12 14 16 18 20 0 10 20

30 40

50 60 0.5*(t_R + t_L) - t0 sigtraw

Entries 1000

Mean 17.48

RMS 0.5609

Underflow 0

Overflow 0

Integral 1000

10 12 14 16 18 20 0

10

20

30

40

50

60 sigtraw

0.5*(t_T + t_B) - t0

sigtgen

Entries 1000 Mean 25 RMS 0.08063 Underflow 0 Overflow 0 Integral 1000 / ndf

2χ 15.55 / 22 Prob 0.8375 Constant 3.93±

99.13 Mean 0.0± 25 Sigma 0.00192 ± 0.07947

23 24 25 26 27 0

20

40

60

80

100

±

0.5*(tgen_R + tgen_L) - t0 sigtgen_{Entries 1000}

Mean 25 RMS 0.07794 Underflow 0 Overflow 0 Integral 1000 / ndf

2χ 16.44 / 22 Prob 0.7935 Constant 4.03±

99.97 Mean 0.0± 25 Sigma 0.00199 ± 0.07872

23 24 25 26 27 0

20

40

60

80

100

120 sigtgen

Entries 1000

±

0.5*(tgen_T + tgen_B) - t0