sigt naive cor

Entries 1000 Mean 7.559 RMS 0.2066 Underflow 0 Overflow 3 Integral 997 / ndf

2χ 90.71 / 56 Prob 0.002291 Constant 3.46±

75.26 Mean 0.003±

7.519 Sigma 0.00311 ± 0.09625

6 7 8 9 10 0 10 20 30 40 50 60 70 80 90

±

0.5*(tnaive_R + tnaive_L) - t0 sigt naive cor_{Entries 1000}

Mean 7.557 RMS 0.2572 Underflow 0 Overflow 0 Integral 1000 / ndf

2χ 77.05 / 60 Prob 0.06819 Constant 3.36±

77.79 Mean 0.003±

7.511 Sigma 0.00269 ± 0.09481

6 7 8 9 10 0

20

40

60

80

100 sigt naive cor

Entries 1000

±

0.5*(tnaive_T + tnaive_B) - t0

sigtcor

Entries 1000 Mean 14.15 RMS 0.08502 Underflow 0 Overflow 0 Integral 1000 / ndf

2χ 24.07 / 26 Prob 0.5717 Constant 3.79±

94.68 Mean 0.00±

14.15 Sigma 0.00200 ± 0.08234

12 13 14 15 16 0

20

40

60

80

100

±

0.5*(tcor_R + tcor_L) - t0 sigtcor_{Entries 1000}

Mean 14.15 RMS 0.08013 Underflow 0 Overflow 0 Integral 1000 / ndf

2χ 26.54 / 26 Prob 0.4339 Constant 3.93±

99.95 Mean 0.00±

14.15 Sigma 0.00181 ± 0.07784

12 13 14 15 16 0 20 40 60 80 100 120 sigtcor

Entries 1000

±

0.5*(tcor_T + tcor_B) - t0