Energy FCAL (GeV)

0 0.5 1 1.5 2 2.5 3

Energy BCAL (GeV)

0

0.5

1

1.5

2

2.5

0

100

200

300

400

500

600 Electromagnetic background

Energy FCAL (GeV)

0 0.5 1 1.5 2 2.5 3 3.5 4 4.5

Energy BCAL (GeV)

0 0.5 1 1.5 2 2.5 3 3.5

0 20 40 60 80 100 120 140 160 180 < 8 GeV γ Hadronic E

Energy FCAL (GeV)

0 1 2 3 4 5 6 7

Energy BCAL (GeV)

0 1 2

3 4

5

6

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2 > 8 GeV γ Hadronic E