Energy FCAL (GeV)

0 0.20.40.60.8 1 1.21.41.61.8 2

Energy BCAL (GeV)

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

0

50

100

150

200

250 Electromagnetic background

Energy FCAL (GeV)

0 1 2 3 4 5

Energy BCAL (GeV)

0

1

2

3

4

5

0

500

1000

1500

2000

2500

3000

< 8 GeV γ Hadronic E

Energy FCAL (GeV)

0 1 2 3 4 5 6 7 8

Energy BCAL (GeV)

0 1 2 3 4 5 6 7 8

0

5

10

15

20

25

> 8 GeV γ Hadronic E