Z (cm)

0 100 200 300 400 500

(T) zB

0

0.5

1

1.5

2

2.5

3 vs. z along magnet axis zB October 29, 2010 ES_{svn revsion 6801}

solenoid_1500_poisson_20090814_01 zB