\hyphenation{Post-Script Sprin-ger}
\begin{thebibliography}{1}

\bibitem{LASSreport}
D.~Aston et~al.
\newblock The {LASS} spectrometer.
\newblock
  SLAC-R-298.\\http://www.slac.stanford.edu/pubs/slacreports/slac-r-298.html,
  1986.

\bibitem{short_cover}
G.~Biallas, E.~Chudakov, E.S. Smith, T.~Whitlatch, and E.~Wolin.
\newblock Overview of the {Hall D} solenoid refurbishment and testing.
\newblock GlueX-doc-1612, September 2010.

\end{thebibliography}
