incident /E reconstructed E 0.9 0.95 1 1.05 1.1

Events

0 1000

2000

3000

4000

5000

6000

7000

8000

9000

E 0

Fitted with Crystal ball function 0.015 ± = 1.333 α 0.0001 ± mean = 0.9994

0.085 ± n = 2.611 0.0001 ± = 0.0165 σ